X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/f190422ae9778231d2a96649f0edb2ff4739b86a..ff8e2c5d55ac3bf5d897c774879f5f544b518553:/src/views/process-log-panel/process-log-form.tsx

diff --git a/src/views/process-log-panel/process-log-form.tsx b/src/views/process-log-panel/process-log-form.tsx
index dfac832f..eab9fe1d 100644
--- a/src/views/process-log-panel/process-log-form.tsx
+++ b/src/views/process-log-panel/process-log-form.tsx
@@ -31,11 +31,11 @@ export const ProcessLogForm = withStyles(styles)(
         <form autoComplete="off">
             <FormControl className={classes.formControl}>
                 <InputLabel shrink htmlFor="log-label-placeholder">
-                    Log
+                    Event Type
                 </InputLabel>
                 <Select
                     value={selectedFilter.value}
-                    onChange={event => onChange}
+                    onChange={({ target }) => onChange({ label: target.innerText, value: target.value })}
                     input={<Input name="eventType" id="log-label-placeholder" />}
                     name="eventType">
                     {
