X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/f05e6a9cece7e3b118134136ee81bd7477ad10a0..7ae86efd9905582df4191910528c3803a68ba81b:/src/views/workbench/workbench.test.tsx

diff --git a/src/views/workbench/workbench.test.tsx b/src/views/workbench/workbench.test.tsx
index 79a98ad6..538b8e78 100644
--- a/src/views/workbench/workbench.test.tsx
+++ b/src/views/workbench/workbench.test.tsx
@@ -4,9 +4,9 @@
 
 import * as React from 'react';
 import * as ReactDOM from 'react-dom';
-import Workbench from '../../views/workbench/workbench';
+import { Workbench } from '../../views/workbench/workbench';
 import { Provider } from "react-redux";
-import configureStore from "../../store/store";
+import { configureStore } from "../../store/store";
 import createBrowserHistory from "history/createBrowserHistory";
 import { ConnectedRouter } from "react-router-redux";
 import { MuiThemeProvider } from '@material-ui/core/styles';
