X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/ef3b2c15f10a3fea50170bc346105d909145a98f..HEAD:/src/views-components/search-bar/search-bar-view.test.tsx

diff --git a/src/views-components/search-bar/search-bar-view.test.tsx b/src/views-components/search-bar/search-bar-view.test.tsx
index 3f162613..2f7ed656 100644
--- a/src/views-components/search-bar/search-bar-view.test.tsx
+++ b/src/views-components/search-bar/search-bar-view.test.tsx
@@ -2,11 +2,9 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from "react";
+import React from "react";
 import { mount, configure } from "enzyme";
-// import { SearchBarView, DEFAULT_SEARCH_DEBOUNCE } from "./search-bar-view";
-
-import * as Adapter from 'enzyme-adapter-react-16';
+import Adapter from 'enzyme-adapter-react-16';
 
 
 configure({ adapter: new Adapter() });
