X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/ee347878e1ad3b6f82787ac27b6d3b6510401ecd..542c909d574067382de91721b42d5f05da4035da:/src/views/process-panel/process-panel.tsx

diff --git a/src/views/process-panel/process-panel.tsx b/src/views/process-panel/process-panel.tsx
index 8adec3bd..75e934ab 100644
--- a/src/views/process-panel/process-panel.tsx
+++ b/src/views/process-panel/process-panel.tsx
@@ -54,7 +54,7 @@ const mapDispatchToProps = (dispatch: Dispatch): ProcessPanelRootActionProps =>
     cancelProcess: (uuid) => dispatch<any>(cancelRunningWorkflow(uuid)),
     onLogFilterChange: (filter) => dispatch(setProcessLogsPanelFilter(filter.value)),
     navigateToLog: (uuid) => dispatch<any>(navigateToLogCollection(uuid)),
-    fetchOutputs: (uuid, setOutputs) => dispatch<any>(loadOutputs(uuid, setOutputs)),
+    fetchOutputs: (containerRequest, setOutputs) => dispatch<any>(loadOutputs(containerRequest, setOutputs)),
 });
 
 const getFilters = (processPanel: ProcessPanelState, processes: Process[]) => {
