X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/ec2ce1a965e15cb272737251b56bca2c1529ebff..aa48015966dd61d462f43a1a336b1700c78624aa:/src/views-components/data-explorer/data-explorer.tsx

diff --git a/src/views-components/data-explorer/data-explorer.tsx b/src/views-components/data-explorer/data-explorer.tsx
index ed4bffd6..48046987 100644
--- a/src/views-components/data-explorer/data-explorer.tsx
+++ b/src/views-components/data-explorer/data-explorer.tsx
@@ -3,29 +3,38 @@
 // SPDX-License-Identifier: AGPL-3.0
 
 import { connect } from "react-redux";
-import { RootState } from "~/store/store";
-import { DataExplorer as DataExplorerComponent } from "~/components/data-explorer/data-explorer";
-import { getDataExplorer } from "~/store/data-explorer/data-explorer-reducer";
+import { RootState } from "store/store";
+import { DataExplorer as DataExplorerComponent } from "components/data-explorer/data-explorer";
+import { getDataExplorer } from "store/data-explorer/data-explorer-reducer";
 import { Dispatch } from "redux";
-import { dataExplorerActions } from "~/store/data-explorer/data-explorer-action";
-import { DataColumn } from "~/components/data-table/data-column";
-import { DataColumns } from "~/components/data-table/data-table";
-import { DataTableFilters } from '~/components/data-table-filters/data-table-filters-tree';
+import { dataExplorerActions } from "store/data-explorer/data-explorer-action";
+import { DataColumn } from "components/data-table/data-column";
+import { DataColumns } from "components/data-table/data-table";
+import { DataTableFilters } from 'components/data-table-filters/data-table-filters-tree';
+import { LAST_REFRESH_TIMESTAMP } from "components/refresh-button/refresh-button";
 
 interface Props {
     id: string;
     onRowClick: (item: any) => void;
-    onContextMenu?: (event: React.MouseEvent<HTMLElement>, item: any) => void;
+    onContextMenu?: (event: React.MouseEvent<HTMLElement>, item: any, isAdmin?: boolean) => void;
     onRowDoubleClick: (item: any) => void;
     extractKey?: (item: any) => React.Key;
 }
 
 const mapStateToProps = (state: RootState, { id }: Props) => {
     const progress = state.progressIndicator.find(p => p.id === id);
-    const working = progress && progress.working;
+    const dataExplorerState = getDataExplorer(state.dataExplorer, id);
     const currentRoute = state.router.location ? state.router.location.pathname : '';
+    const currentRefresh = localStorage.getItem(LAST_REFRESH_TIMESTAMP) || '';
     const currentItemUuid = currentRoute === '/workflows' ? state.properties.workflowPanelDetailsUuid : state.detailsPanel.resourceUuid;
-    return { ...getDataExplorer(state.dataExplorer, id), working, paperKey: currentRoute, currentItemUuid };
+    return {
+        ...dataExplorerState,
+        working: !!progress?.working,
+        currentRefresh: currentRefresh,
+        currentRoute: currentRoute,
+        paperKey: currentRoute,
+        currentItemUuid,
+    };
 };
 
 const mapDispatchToProps = () => {
@@ -70,5 +79,5 @@ const mapDispatchToProps = () => {
     });
 };
 
-export const DataExplorer = connect(mapStateToProps, mapDispatchToProps())(DataExplorerComponent);
+export const DataExplorer = connect(mapStateToProps, mapDispatchToProps)(DataExplorerComponent);
 
