X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/eb4491eea9ba873845f7a5796d139d19977f8112..ef8fb604ad4a868cae8ed6ad31c1fd1520dd73e0:/src/components/context-menu/context-menu.test.tsx

diff --git a/src/components/context-menu/context-menu.test.tsx b/src/components/context-menu/context-menu.test.tsx
index faf05f1f..31e77200 100644
--- a/src/components/context-menu/context-menu.test.tsx
+++ b/src/components/context-menu/context-menu.test.tsx
@@ -2,9 +2,9 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from "react";
+import React from "react";
 import { mount, configure } from "enzyme";
-import * as Adapter from "enzyme-adapter-react-16";
+import Adapter from "enzyme-adapter-react-16";
 import { ContextMenu } from "./context-menu";
 import { ListItem } from "@material-ui/core";
 import { ShareIcon } from "../icon/icon";
