X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/eb4491eea9ba873845f7a5796d139d19977f8112..8e6e183396531005e9c6cee19e6e79998047cabd:/src/components/popover/popover.test.tsx

diff --git a/src/components/popover/popover.test.tsx b/src/components/popover/popover.test.tsx
index 4bc2ebd4..c728b49f 100644
--- a/src/components/popover/popover.test.tsx
+++ b/src/components/popover/popover.test.tsx
@@ -2,9 +2,9 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from "react";
+import React from "react";
 import { mount, configure } from "enzyme";
-import * as Adapter from "enzyme-adapter-react-16";
+import Adapter from "enzyme-adapter-react-16";
 
 import { Popover, DefaultTrigger } from "./popover";
 import Button, { ButtonProps } from "@material-ui/core/Button";
