X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/eb4491eea9ba873845f7a5796d139d19977f8112..60df7056b536f7a333299638ca19bc12aee94d47:/src/validators/validators.tsx

diff --git a/src/validators/validators.tsx b/src/validators/validators.tsx
index edd07822..edc47265 100644
--- a/src/validators/validators.tsx
+++ b/src/validators/validators.tsx
@@ -9,8 +9,14 @@ export const TAG_KEY_VALIDATION = [require, maxLength(255)];
 export const TAG_VALUE_VALIDATION = [require, maxLength(255)];
 
 export const PROJECT_NAME_VALIDATION = [require, maxLength(255)];
-export const PROJECT_DESCRIPTION_VALIDATION = [maxLength(255)];
 
 export const COLLECTION_NAME_VALIDATION = [require, maxLength(255)];
 export const COLLECTION_DESCRIPTION_VALIDATION = [maxLength(255)];
-export const COLLECTION_PROJECT_VALIDATION = [require];
\ No newline at end of file
+export const COLLECTION_PROJECT_VALIDATION = [require];
+
+export const COPY_NAME_VALIDATION = [require, maxLength(255)];
+export const COPY_FILE_VALIDATION = [require];
+
+export const MOVE_TO_VALIDATION = [require];
+
+export const PROCESS_NAME_VALIDATION = [require, maxLength(255)];
\ No newline at end of file
