X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/ea80145c5d632a647cf583cf0ebbf2a866d85549..823ac8656c70068c6cd59bb96ec8b6d6201076d9:/src/components/context-menu/context-menu.test.tsx

diff --git a/src/components/context-menu/context-menu.test.tsx b/src/components/context-menu/context-menu.test.tsx
index 95a219f9..a2452538 100644
--- a/src/components/context-menu/context-menu.test.tsx
+++ b/src/components/context-menu/context-menu.test.tsx
@@ -5,7 +5,7 @@
 import * as React from "react";
 import { mount, configure, shallow } from "enzyme";
 import * as Adapter from "enzyme-adapter-react-16";
-import ContextMenu from "./context-menu";
+import { ContextMenu } from "./context-menu";
 import { ListItem } from "@material-ui/core";
 import { ShareIcon } from "../icon/icon";
 
@@ -33,4 +33,4 @@ describe("<ContextMenu />", () => {
         contextMenu.find(ListItem).at(2).simulate("click");
         expect(onItemClick).toHaveBeenCalledWith(items[1][0]);
     });
-});
\ No newline at end of file
+});
