X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/e79b7364ea28b6f0719c9adf409ba1217b9ccac8..42db83a0075f9704dcbfb2cd29821c97ff0fe34b:/src/views/run-process-panel/inputs/boolean-input.tsx

diff --git a/src/views/run-process-panel/inputs/boolean-input.tsx b/src/views/run-process-panel/inputs/boolean-input.tsx
index e66ec3d7..5da54742 100644
--- a/src/views/run-process-panel/inputs/boolean-input.tsx
+++ b/src/views/run-process-panel/inputs/boolean-input.tsx
@@ -28,4 +28,5 @@ const Input = (props: GenericInputProps) =>
     <Switch
         color='primary'
         checked={props.input.value}
-        onChange={() => props.input.onChange(props.input.value)} />;
\ No newline at end of file
+        onChange={() => props.input.onChange(props.input.value)} 
+        disabled={props.commandInput.disabled} />;
\ No newline at end of file
