X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/e3ca6297f8ec9f3504074291ce6cd10babeb69bf..2b6abd3b7dea25f9b19156bb06b2763b118a67b5:/src/components/file-upload/file-upload.tsx?ds=sidebyside

diff --git a/src/components/file-upload/file-upload.tsx b/src/components/file-upload/file-upload.tsx
index 54d5b5db..e6c15144 100644
--- a/src/components/file-upload/file-upload.tsx
+++ b/src/components/file-upload/file-upload.tsx
@@ -34,7 +34,8 @@ const styles: StyleRulesCallback<CssRules> = theme => ({
         width: "100%",
         height: "200px",
         position: "relative",
-        border: "1px solid rgba(0, 0, 0, 0.42)"
+        border: "1px solid rgba(0, 0, 0, 0.42)",
+        boxSizing: 'border-box',
     },
     dropzoneBorder: {
         content: "",
