X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/e2a464e9087120c7569976eb9a172a91d2ec0f09..247b312a502ac3fdcc915a2e6e858a0eea8c0c5b:/src/components/chips-input/chips-input.tsx

diff --git a/src/components/chips-input/chips-input.tsx b/src/components/chips-input/chips-input.tsx
index 12932c54..fc5fda01 100644
--- a/src/components/chips-input/chips-input.tsx
+++ b/src/components/chips-input/chips-input.tsx
@@ -15,6 +15,8 @@ interface ChipsInputProps<Value> {
     createNewValue: (value: string) => Value;
     inputComponent?: React.ComponentType<InputProps>;
     inputProps?: InputProps;
+    deletable?: boolean;
+    orderable?: boolean;
 }
 
 type CssRules = 'chips' | 'input' | 'inputContainer';
