X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/e02a51f2799aaab5cdd0194dc9363e31592d4209..4223548258ddb3dd7bfb9c520c7c8eb3b5e80f84:/src/views/workbench/workbench.test.tsx

diff --git a/src/views/workbench/workbench.test.tsx b/src/views/workbench/workbench.test.tsx
index 14ca6947..29eed602 100644
--- a/src/views/workbench/workbench.test.tsx
+++ b/src/views/workbench/workbench.test.tsx
@@ -12,6 +12,7 @@ import { ConnectedRouter } from "react-router-redux";
 import { MuiThemeProvider } from '@material-ui/core/styles';
 import { CustomTheme } from '~/common/custom-theme';
 import { createServices } from "~/services/services";
+import 'jest-localstorage-mock';
 
 const history = createBrowserHistory();
 
