X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/dd89200ad6fdbfa337fdbab5f54def8712c6746c..e13e7dd672160e4ab5569c24133f4f6032db4a9a:/src/views/workbench/workbench.test.tsx

diff --git a/src/views/workbench/workbench.test.tsx b/src/views/workbench/workbench.test.tsx
index 3587283e..d03e1172 100644
--- a/src/views/workbench/workbench.test.tsx
+++ b/src/views/workbench/workbench.test.tsx
@@ -18,6 +18,7 @@ const history = createBrowserHistory();
 it('renders without crashing', () => {
     const div = document.createElement('div');
     const services = createServices("/arvados/v1");
+	services.authService.getUuid = jest.fn().mockReturnValueOnce('test');
     const store = configureStore(createBrowserHistory(), services);
     ReactDOM.render(
         <MuiThemeProvider theme={CustomTheme}>
