X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/d9ee24d0f78a21603e2276d0d3142d4db40a831b..refs/heads/17231-stuck-on-loading-page-after-login:/src/views/link-account-panel/link-account-panel-root.tsx

diff --git a/src/views/link-account-panel/link-account-panel-root.tsx b/src/views/link-account-panel/link-account-panel-root.tsx
index 2438f04e..10de75e8 100644
--- a/src/views/link-account-panel/link-account-panel-root.tsx
+++ b/src/views/link-account-panel/link-account-panel-root.tsx
@@ -139,7 +139,7 @@ export const LinkAccountPanelRoot = withStyles(styles)(
                                             <Grid item>
                                                 <Button color="primary" variant="contained" onClick={() => startLinking(LinkAccountType.ADD_LOCAL_TO_REMOTE)}>
                                                     Link an account from {localCluster} to this account
-					                        </Button>
+					                            </Button>
                                             </Grid> </>
                                         : <Grid item>Please visit cluster
 				                        <a href={remoteHostsConfig[loginCluster].workbench2Url + "/link_account"}>{loginCluster}</a>
