X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/d866a8ad7d9d8f48c761fa7ea8ea96b17cbfdb2f..refs/heads/17231-stuck-on-loading-page-after-login:/src/views/link-account-panel/link-account-panel.tsx

diff --git a/src/views/link-account-panel/link-account-panel.tsx b/src/views/link-account-panel/link-account-panel.tsx
index f0a9e5a1..78b7efd2 100644
--- a/src/views/link-account-panel/link-account-panel.tsx
+++ b/src/views/link-account-panel/link-account-panel.tsx
@@ -5,7 +5,7 @@
 import { RootState } from '~/store/store';
 import { Dispatch } from 'redux';
 import { connect } from 'react-redux';
-import { startLinking, cancelLinking, linkAccount, linkAccountPanelActions } from '~/store/link-account-panel/link-account-panel-actions';
+import { startLinking, linkAccount, linkAccountPanelActions, cancelLinking } from '~/store/link-account-panel/link-account-panel-actions';
 import { LinkAccountType } from '~/models/link-account';
 import {
     LinkAccountPanelRoot,
@@ -15,10 +15,11 @@ import {
 
 const mapStateToProps = (state: RootState): LinkAccountPanelRootDataProps => {
     return {
-        remoteHosts: state.auth.remoteHosts,
+        remoteHostsConfig: state.auth.remoteHostsConfig,
         hasRemoteHosts: Object.keys(state.auth.remoteHosts).length > 1 && state.auth.loginCluster === "",
         selectedCluster: state.linkAccountPanel.selectedCluster,
         localCluster: state.auth.localCluster,
+        loginCluster: state.auth.loginCluster,
         targetUser: state.linkAccountPanel.targetUser,
         userToLink: state.linkAccountPanel.userToLink,
         status: state.linkAccountPanel.status,
