X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/d19d853e83383a6b75f638be99472aa626a05524..refs/heads/14504-users-admin-panel:/src/views/compute-node-panel/compute-node-panel-root.tsx?ds=inline

diff --git a/src/views/compute-node-panel/compute-node-panel-root.tsx b/src/views/compute-node-panel/compute-node-panel-root.tsx
index 7b1013b3..2d325b51 100644
--- a/src/views/compute-node-panel/compute-node-panel-root.tsx
+++ b/src/views/compute-node-panel/compute-node-panel-root.tsx
@@ -20,7 +20,7 @@ const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
         overflow: 'auto'
     },
     tableRow: {
-        '& td, th': {
+        '& th': {
             whiteSpace: 'nowrap'
         }
     }
