X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/cf83b358f087a87b5ff095d3ed7a8c6920c60ffe..ae946826d1670cb786688e859bc1f3257150ae75:/src/views/not-found-panel/not-found-panel-root.test.tsx?ds=sidebyside

diff --git a/src/views/not-found-panel/not-found-panel-root.test.tsx b/src/views/not-found-panel/not-found-panel-root.test.tsx
index 315b4b8c..d2acd777 100644
--- a/src/views/not-found-panel/not-found-panel-root.test.tsx
+++ b/src/views/not-found-panel/not-found-panel-root.test.tsx
@@ -2,12 +2,12 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { mount, configure } from 'enzyme';
-import * as Adapter from "enzyme-adapter-react-16";
+import Adapter from "enzyme-adapter-react-16";
 import { StyledComponentProps, MuiThemeProvider } from '@material-ui/core';
-import { ClusterConfigJSON } from '~/common/config';
-import { CustomTheme } from '~/common/custom-theme';
+import { ClusterConfigJSON } from 'common/config';
+import { CustomTheme } from 'common/custom-theme';
 import { NotFoundPanelRoot, NotFoundPanelRootDataProps, CssRules } from './not-found-panel-root';
 
 configure({ adapter: new Adapter() });
