X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/cf48e928d4d334b0b6434529d7619c616da319f2..a92bb3822b537682ca621df3c05a458b9ae3420b:/src/views/workbench/workbench.test.tsx

diff --git a/src/views/workbench/workbench.test.tsx b/src/views/workbench/workbench.test.tsx
index 6bd35b34..f7128a74 100644
--- a/src/views/workbench/workbench.test.tsx
+++ b/src/views/workbench/workbench.test.tsx
@@ -6,10 +6,12 @@ import * as React from 'react';
 import * as ReactDOM from 'react-dom';
 import Workbench from '../../views/workbench/workbench';
 import { Provider } from "react-redux";
-import store from "../../store/store";
+import configureStore from "../../store/store";
+import createBrowserHistory from "history/createBrowserHistory";
 
 it('renders without crashing', () => {
     const div = document.createElement('div');
+    const store = configureStore({ projects: [], router: { location: null } }, createBrowserHistory());
     ReactDOM.render(<Provider store={store}><Workbench/></Provider>, div);
     ReactDOM.unmountComponentAtNode(div);
 });
