X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/c7d5dec8425d970c41a81c6328b91665acec1ec0..1bde07ef5884a55bbb47aaf30a90b122a4810617:/src/components/warning/warning.tsx

diff --git a/src/components/warning/warning.tsx b/src/components/warning/warning.tsx
index 95e495d7..d459a37d 100644
--- a/src/components/warning/warning.tsx
+++ b/src/components/warning/warning.tsx
@@ -2,12 +2,12 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from "react";
-import { ErrorIcon } from "~/components/icon/icon";
+import React from "react";
+import { ErrorIcon } from "components/icon/icon";
 import { Tooltip } from "@material-ui/core";
-import { disallowSlash } from "~/validators/valid-name";
+import { disallowSlash } from "validators/valid-name";
 import { connect } from "react-redux";
-import { RootState } from "~/store/store";
+import { RootState } from "store/store";
 
 interface WarningComponentProps {
     text: string;
