X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/c77d85e1b722e2140736af692235ceed24952563..4b75b09d1c75d6796e75efc55e7b06917834b63e:/src/components/column-selector/column-selector.tsx

diff --git a/src/components/column-selector/column-selector.tsx b/src/components/column-selector/column-selector.tsx
index 317e6bc0..5fbef6b6 100644
--- a/src/components/column-selector/column-selector.tsx
+++ b/src/components/column-selector/column-selector.tsx
@@ -14,6 +14,7 @@ import { ArvadosTheme } from "common/custom-theme";
 interface ColumnSelectorDataProps {
     columns: DataColumns<any>;
     onColumnToggle: (column: DataColumn<any>) => void;
+    className?: string;
 }
 
 type CssRules = "checkbox";
