X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/c59db7f1ffae1a16a5458740510e173582e68925..3c7e3cdc547ad5468421e1c049daa94b0d4b8bc0:/src/components/float-input/float-input.tsx

diff --git a/src/components/float-input/float-input.tsx b/src/components/float-input/float-input.tsx
index 16e18cb1..1b909306 100644
--- a/src/components/float-input/float-input.tsx
+++ b/src/components/float-input/float-input.tsx
@@ -2,7 +2,7 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { Input } from '@material-ui/core';
 import { InputProps } from '@material-ui/core/Input';
 
