X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/c52e09e7162f169a00439f00772b07f01764ac38..3c7e3cdc547ad5468421e1c049daa94b0d4b8bc0:/src/views-components/side-panel-button/side-panel-button.tsx

diff --git a/src/views-components/side-panel-button/side-panel-button.tsx b/src/views-components/side-panel-button/side-panel-button.tsx
index ed41371a..a219e55a 100644
--- a/src/views-components/side-panel-button/side-panel-button.tsx
+++ b/src/views-components/side-panel-button/side-panel-button.tsx
@@ -2,7 +2,7 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { connect, DispatchProp } from 'react-redux';
 import { RootState } from 'store/store';
 import { ArvadosTheme } from 'common/custom-theme';
