X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/c324b64f3b26e79b4640b6f0cf55671f1a261bca..e42867f560b3c2f4c09cf6a2c07c964c63714141:/src/views/process-log-panel/process-log-panel-root.tsx

diff --git a/src/views/process-log-panel/process-log-panel-root.tsx b/src/views/process-log-panel/process-log-panel-root.tsx
index 38870c40..be043722 100644
--- a/src/views/process-log-panel/process-log-panel-root.tsx
+++ b/src/views/process-log-panel/process-log-panel-root.tsx
@@ -2,14 +2,14 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { Grid } from '@material-ui/core';
-import { Process } from '~/store/processes/process';
-import { ProcessLogMainCard } from '~/views/process-log-panel/process-log-main-card';
-import { ProcessLogFormDataProps, ProcessLogFormActionProps } from '~/views/process-log-panel/process-log-form';
-import { DefaultView } from '~/components/default-view/default-view';
-import { ProcessIcon } from '~/components/icon/icon';
-import { CodeSnippetDataProps } from '~/components/code-snippet/code-snippet';
+import { Process } from 'store/processes/process';
+import { ProcessLogMainCard } from 'views/process-log-panel/process-log-main-card';
+import { ProcessLogFormDataProps, ProcessLogFormActionProps } from 'views/process-log-panel/process-log-form';
+import { DefaultView } from 'components/default-view/default-view';
+import { ProcessIcon } from 'components/icon/icon';
+import { CodeSnippetDataProps } from 'components/code-snippet/code-snippet';
 import { ProcessLogMainCardActionProps } from './process-log-main-card';
 
 export type ProcessLogPanelRootDataProps = {
