X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/c0afd448c39a41d229612afe47643aed7a2cf5dd..c4c1bd525a660118ecf3b53811cd112a992fdc81:/src/components/column-selector/column-selector.test.tsx?ds=sidebyside

diff --git a/src/components/column-selector/column-selector.test.tsx b/src/components/column-selector/column-selector.test.tsx
index 02265fc4..87fa2ca0 100644
--- a/src/components/column-selector/column-selector.test.tsx
+++ b/src/components/column-selector/column-selector.test.tsx
@@ -2,9 +2,9 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from "react";
+import React from "react";
 import { mount, configure } from "enzyme";
-import * as Adapter from "enzyme-adapter-react-16";
+import Adapter from "enzyme-adapter-react-16";
 import { ColumnSelector, ColumnSelectorTrigger } from "./column-selector";
 import { ListItem, Checkbox } from "@material-ui/core";
 import { DataColumns } from "../data-table/data-table";
