X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/c09ad994a225b752e81acc4d956981f2239d5297..8df09b8ee52974e5bcd5fea862c3639f54afb54b:/src/views/run-process-panel/inputs/enum-input.tsx

diff --git a/src/views/run-process-panel/inputs/enum-input.tsx b/src/views/run-process-panel/inputs/enum-input.tsx
index 9a22dbe5..3b0289e7 100644
--- a/src/views/run-process-panel/inputs/enum-input.tsx
+++ b/src/views/run-process-panel/inputs/enum-input.tsx
@@ -3,9 +3,9 @@
 // SPDX-License-Identifier: AGPL-3.0
 
 import * as React from 'react';
-import { EnumCommandInputParameter, CommandInputEnumSchema } from '~/models/workflow';
 import { Field } from 'redux-form';
 import { Select, MenuItem } from '@material-ui/core';
+import { EnumCommandInputParameter, CommandInputEnumSchema } from '~/models/workflow';
 import { GenericInputProps, GenericInput } from './generic-input';
 
 export interface EnumInputProps {
