X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/c067c93c2159b21980551e2d87ebb10f985cba84..ba5b505f1cda78dafa9e17df7af33c9ae2c6829d:/src/components/tree/tree.test.tsx

diff --git a/src/components/tree/tree.test.tsx b/src/components/tree/tree.test.tsx
index 50d1368a..8c380026 100644
--- a/src/components/tree/tree.test.tsx
+++ b/src/components/tree/tree.test.tsx
@@ -92,7 +92,7 @@ describe("Tree component", () => {
             id: "3",
             open: true,
             active: true,
-            status: 1,
+            status: TreeItemStatus.LOADED,
         });
     });
 
