X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/bf6ffb898a38a806ea0dd98daca7b3801923b62f..d29c915c1a724c7e26a4deeacda76846d5635a5f:/src/index.tsx

diff --git a/src/index.tsx b/src/index.tsx
index 03840d49..5d939d36 100644
--- a/src/index.tsx
+++ b/src/index.tsx
@@ -66,6 +66,7 @@ import { workflowActionSet } from 'views-components/context-menu/action-sets/wor
 import { snackbarActions, SnackbarKind } from "store/snackbar/snackbar-actions";
 import { openNotFoundDialog } from './store/not-found-panel/not-found-panel-action';
 import { storeRedirects } from './common/redirect-to';
+import { searchResultsActionSet } from 'views-components/context-menu/action-sets/search-results-action-set';
 
 console.log(`Starting arvados [${getBuildInfo()}]`);
 
@@ -104,6 +105,7 @@ addMenuActionSet(ContextMenuKind.PROJECT_ADMIN, projectAdminActionSet);
 addMenuActionSet(ContextMenuKind.FILTER_GROUP_ADMIN, filterGroupAdminActionSet);
 addMenuActionSet(ContextMenuKind.PERMISSION_EDIT, permissionEditActionSet);
 addMenuActionSet(ContextMenuKind.WORKFLOW, workflowActionSet);
+addMenuActionSet(ContextMenuKind.SEARCH_RESULTS, searchResultsActionSet);
 
 storeRedirects();
 
