X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/bde866ac574bdf34e17c1d8124f2dc36e854ad3c..87eaf9dd29c3a9ad816f0cb45b89282644b328d3:/src/views-components/process-input-dialog/process-input-dialog.tsx

diff --git a/src/views-components/process-input-dialog/process-input-dialog.tsx b/src/views-components/process-input-dialog/process-input-dialog.tsx
index a639fa88..bbbd97f5 100644
--- a/src/views-components/process-input-dialog/process-input-dialog.tsx
+++ b/src/views-components/process-input-dialog/process-input-dialog.tsx
@@ -33,10 +33,10 @@ export const ProcessInputDialog = withDialog(PROCESS_INPUT_DIALOG_NAME)(
 
 const getInputs = (data: any) =>
     data && data.mounts.varLibCwlWorkflowJson ? data.mounts.varLibCwlWorkflowJson.content.graph[1].inputs.map((it: any) => (
-        { type: it.type, id: it.id, label: it.label, value: getValue(it.id, data.mounts.varLibCwlCwlInputJson.content), disabled: true }
+        { type: it.type, id: it.id, label: it.label, value: getInputValue(it.id, data.mounts.varLibCwlCwlInputJson.content), disabled: true }
     )) : [];
 
-const getValue = (id: string, data: any) => {
+const getInputValue = (id: string, data: any) => {
     switch (id) {
         case "#main/example_flag":
             return data.exampleFlag;
