X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/bccb9ca5151f041d8c8b73098a3e1874023e3efa..e9d30481d8d57a0b906364ee115e136305b7ce79:/src/components/data-table-filters/data-table-filters.test.tsx?ds=sidebyside

diff --git a/src/components/data-table-filters/data-table-filters.test.tsx b/src/components/data-table-filters/data-table-filters.test.tsx
index b0a84b51..9a3fa4dc 100644
--- a/src/components/data-table-filters/data-table-filters.test.tsx
+++ b/src/components/data-table-filters/data-table-filters.test.tsx
@@ -4,7 +4,7 @@
 
 import * as React from "react";
 import { mount, configure } from "enzyme";
-import { DataTableFilters, DataTableFilterItem } from "./data-table-filters";
+import { DataTableFilters } from "./data-table-filters";
 import * as Adapter from 'enzyme-adapter-react-16';
 import { Checkbox, ButtonBase, ListItem, Button, ListItemText } from "@material-ui/core";
 
