X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/bc311e9eb8d6b0e4850823d4a9acd29d6176d06b..50af2fa94e9f3e3025723c3d0703cb90771f3fbd:/src/views-components/search-bar/search-bar-view.test.tsx

diff --git a/src/views-components/search-bar/search-bar-view.test.tsx b/src/views-components/search-bar/search-bar-view.test.tsx
index 2ecb8353..801bf7ad 100644
--- a/src/views-components/search-bar/search-bar-view.test.tsx
+++ b/src/views-components/search-bar/search-bar-view.test.tsx
@@ -102,5 +102,7 @@ const mockSearchProps = () => ({
     loadRecentQueries: () => ['test'],
     saveQuery: jest.fn(),
     deleteSavedQuery: jest.fn(),
-    openSearchView: jest.fn()
+    openSearchView: jest.fn(),
+    editSavedQuery: jest.fn(),
+    navigateTo: jest.fn()
 });
\ No newline at end of file
