X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/b86917ee687fe693a4aee2608c2ceffca660a59e..424f5418a6fd9f49baa1cc79bf0b51f9ab65ac58:/src/views/run-process-panel/inputs/string-input.tsx

diff --git a/src/views/run-process-panel/inputs/string-input.tsx b/src/views/run-process-panel/inputs/string-input.tsx
index dc7075cf..7f02e1d3 100644
--- a/src/views/run-process-panel/inputs/string-input.tsx
+++ b/src/views/run-process-panel/inputs/string-input.tsx
@@ -29,4 +29,4 @@ const StringInputComponent = (props: GenericInputProps) =>
         {...props} />;
 
 const Input = (props: GenericInputProps) =>
-    <MaterialInput fullWidth {...props.input} />;
\ No newline at end of file
+    <MaterialInput fullWidth {...props.input} error={props.meta.touched && !!props.meta.error} />;
\ No newline at end of file
