X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/b6f9b49e6fed67626ae969a6864f45f002fcfd47..f9dde5c781766b8be71d43d0f031c201a0edcfbb:/src/views-components/main-content-bar/main-content-bar.tsx

diff --git a/src/views-components/main-content-bar/main-content-bar.tsx b/src/views-components/main-content-bar/main-content-bar.tsx
index 3806b524..c0014d00 100644
--- a/src/views-components/main-content-bar/main-content-bar.tsx
+++ b/src/views-components/main-content-bar/main-content-bar.tsx
@@ -21,6 +21,7 @@ const isButtonVisible = ({ router }: RootState) => {
     return !Routes.matchWorkflowRoute(pathname) && !Routes.matchUserVirtualMachineRoute(pathname) &&
         !Routes.matchAdminVirtualMachineRoute(pathname) && !Routes.matchRepositoriesRoute(pathname) &&
         !Routes.matchSshKeysAdminRoute(pathname) && !Routes.matchSshKeysUserRoute(pathname) &&
+        !Routes.matchSiteManagerRoute(pathname) &&
         !Routes.matchKeepServicesRoute(pathname) && !Routes.matchComputeNodesRoute(pathname) &&
         !Routes.matchApiClientAuthorizationsRoute(pathname) && !Routes.matchUsersRoute(pathname) &&
         !Routes.matchMyAccountRoute(pathname) && !Routes.matchLinksRoute(pathname);
