X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/b6ac7fe88d347582d39fffa002e300af222c578f..8ff2ace73eab152113f8eec5027a302df48d31a5:/src/views/subprocess-panel/subprocess-panel-root.tsx

diff --git a/src/views/subprocess-panel/subprocess-panel-root.tsx b/src/views/subprocess-panel/subprocess-panel-root.tsx
index b8e1b081..e35a5712 100644
--- a/src/views/subprocess-panel/subprocess-panel-root.tsx
+++ b/src/views/subprocess-panel/subprocess-panel-root.tsx
@@ -65,12 +65,14 @@ export const subprocessPanelColumns: DataColumns<string> = [
 
 export interface SubprocessPanelDataProps {
     resources: ResourcesState;
+    panelName?: string;
 }
 
 export interface SubprocessPanelActionProps {
     onItemClick: (item: string) => void;
     onContextMenu: (event: React.MouseEvent<HTMLElement>, item: string, resources: ResourcesState) => void;
     onItemDoubleClick: (item: string) => void;
+    doHidePanel?: () => void;
 }
 
 type SubprocessPanelProps = SubprocessPanelActionProps & SubprocessPanelDataProps;
@@ -91,5 +93,7 @@ export const SubprocessPanelRoot = (props: SubprocessPanelProps) => {
             <DataTableDefaultView
                 icon={ProcessIcon}
                 messages={DEFAULT_VIEW_MESSAGES} />
-        } />;
+        }
+        doHidePanel={props.doHidePanel}
+        panelName={props.panelName} />;
 };
\ No newline at end of file
