X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/b6a5b173cd4e9f325f371d26204dfe156d911c20..519b431a41a9ab4815a1e4180ee78395b74a85de:/src/components/column-selector/column-selector.test.tsx

diff --git a/src/components/column-selector/column-selector.test.tsx b/src/components/column-selector/column-selector.test.tsx
index 01dba85c..02265fc4 100644
--- a/src/components/column-selector/column-selector.test.tsx
+++ b/src/components/column-selector/column-selector.test.tsx
@@ -17,7 +17,8 @@ describe("<ColumnSelector />", () => {
             {
                 name: "Column 1",
                 render: () => <span />,
-                selected: true
+                selected: true,
+                configurable: true
             },
             {
                 name: "Column 2",
@@ -42,17 +43,20 @@ describe("<ColumnSelector />", () => {
             {
                 name: "Column 1",
                 render: () => <span />,
-                selected: true
+                selected: true,
+                configurable: true
             },
             {
                 name: "Column 2",
                 render: () => <span />,
-                selected: false
+                selected: false,
+                configurable: true
             },
             {
                 name: "Column 3",
                 render: () => <span />,
-                selected: true
+                selected: true,
+                configurable: true
             }
         ];
         const columnsConfigurator = mount(<ColumnSelector columns={columns} onColumnToggle={jest.fn()} />);
@@ -67,7 +71,8 @@ describe("<ColumnSelector />", () => {
             {
                 name: "Column 1",
                 render: () => <span />,
-                selected: true
+                selected: true,
+                configurable: true
             }
         ];
         const onColumnToggle = jest.fn();
