X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/b323a94f313671b44a066a2f91dea562e9464d10..bccb9ca5151f041d8c8b73098a3e1874023e3efa:/src/components/data-explorer/data-explorer.test.tsx

diff --git a/src/components/data-explorer/data-explorer.test.tsx b/src/components/data-explorer/data-explorer.test.tsx
index 5d4877f2..616a9c12 100644
--- a/src/components/data-explorer/data-explorer.test.tsx
+++ b/src/components/data-explorer/data-explorer.test.tsx
@@ -6,10 +6,10 @@ import * as React from "react";
 import { configure, mount } from "enzyme";
 import * as Adapter from 'enzyme-adapter-react-16';
 
-import DataExplorer from "./data-explorer";
-import ColumnSelector from "../column-selector/column-selector";
-import DataTable from "../data-table/data-table";
-import SearchInput from "../search-input/search-input";
+import { DataExplorer } from "./data-explorer";
+import { ColumnSelector } from "../column-selector/column-selector";
+import { DataTable } from "../data-table/data-table";
+import { SearchInput } from "../search-input/search-input";
 import { TablePagination } from "@material-ui/core";
 
 configure({ adapter: new Adapter() });
@@ -109,4 +109,4 @@ const mockDataExplorerProps = () => ({
     onChangePage: jest.fn(),
     onChangeRowsPerPage: jest.fn(),
     onContextMenu: jest.fn()
-});
\ No newline at end of file
+});
