X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/b12a180cf035192be3e22dfa5a2200d4969ce51a..d0b5089542fbb8daf95e5bd82da2cd710bd2b57a:/src/validators/validators.tsx

diff --git a/src/validators/validators.tsx b/src/validators/validators.tsx
index 106c74da..edc47265 100644
--- a/src/validators/validators.tsx
+++ b/src/validators/validators.tsx
@@ -9,13 +9,14 @@ export const TAG_KEY_VALIDATION = [require, maxLength(255)];
 export const TAG_VALUE_VALIDATION = [require, maxLength(255)];
 
 export const PROJECT_NAME_VALIDATION = [require, maxLength(255)];
-export const PROJECT_DESCRIPTION_VALIDATION = [maxLength(255)];
 
 export const COLLECTION_NAME_VALIDATION = [require, maxLength(255)];
 export const COLLECTION_DESCRIPTION_VALIDATION = [maxLength(255)];
 export const COLLECTION_PROJECT_VALIDATION = [require];
 
 export const COPY_NAME_VALIDATION = [require, maxLength(255)];
-export const MAKE_A_COPY_VALIDATION = [require, maxLength(255)];
+export const COPY_FILE_VALIDATION = [require];
 
 export const MOVE_TO_VALIDATION = [require];
+
+export const PROCESS_NAME_VALIDATION = [require, maxLength(255)];
\ No newline at end of file
