X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/af2033d68980358c141ad61c9f82a450d30f4acb..a00f9424fb242f23b73e598715c1b55291c26a04:/src/validators/validators.tsx

diff --git a/src/validators/validators.tsx b/src/validators/validators.tsx
index 605d051c..d9eca97f 100644
--- a/src/validators/validators.tsx
+++ b/src/validators/validators.tsx
@@ -38,3 +38,5 @@ export const SSH_KEY_NAME_VALIDATION = [require, maxLength(255)];
 export const SITE_MANAGER_REMOTE_HOST_VALIDATION = [require, isRemoteHost, maxLength(255)];
 
 export const MY_ACCOUNT_VALIDATION = [require];
+
+export const CHOOSE_VM_VALIDATION = [require];
