X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/af03e74a452da0dad7a74d980eaaae93cf69fea7..8fb6982f9d6d4e76cae9c8b16be36c16ce93c148:/src/views/process-panel/process-panel-root.tsx?ds=inline

diff --git a/src/views/process-panel/process-panel-root.tsx b/src/views/process-panel/process-panel-root.tsx
index 28d2e978..adb6c920 100644
--- a/src/views/process-panel/process-panel-root.tsx
+++ b/src/views/process-panel/process-panel-root.tsx
@@ -163,7 +163,7 @@ export const ProcessPanelRoot = withStyles(styles)(
                         outputUuid={outputUuid || ""}
                     />
                 </MPVPanelContent>
-                <MPVPanelContent forwardProps xs maxHeight='50%' data-cy="process-resources">
+                <MPVPanelContent forwardProps xs data-cy="process-resources">
                     <ProcessResourceCard
                         process={process}
                         nodeInfo={nodeInfo}
