X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/ae7d952a97542c2cfc12f6f41ab0de93af278919..c90e813adcec89899d9db95843295a84fb058c3e:/src/views/workbench/workbench.test.tsx

diff --git a/src/views/workbench/workbench.test.tsx b/src/views/workbench/workbench.test.tsx
index 7b9b74d0..69257922 100644
--- a/src/views/workbench/workbench.test.tsx
+++ b/src/views/workbench/workbench.test.tsx
@@ -14,7 +14,7 @@ const history = createBrowserHistory();
 
 it('renders without crashing', () => {
     const div = document.createElement('div');
-    const store = configureStore({ projects: [], router: { location: null }, auth: {} }, createBrowserHistory());
+    const store = configureStore({ projects: [], router: { location: null }, auth: {}, sidePanel: [] }, createBrowserHistory());
     ReactDOM.render(
         <Provider store={store}>
             <ConnectedRouter history={history}>
