X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/a9ff17bf2167122f7655cebb4d9587ab41527230..7ef76c77956b9938322e23e8981bbf2cee2acff6:/src/components/data-explorer/data-explorer.tsx

diff --git a/src/components/data-explorer/data-explorer.tsx b/src/components/data-explorer/data-explorer.tsx
index cf14303d..d3d26708 100644
--- a/src/components/data-explorer/data-explorer.tsx
+++ b/src/components/data-explorer/data-explorer.tsx
@@ -123,7 +123,7 @@ export const DataExplorer = withStyles(styles)(
                             columns={columns}
                             onColumnToggle={onColumnToggle} />}
                     </Grid>
-                    { doMaximizePanel && !!!panelMaximized &&
+                    { doMaximizePanel && !panelMaximized &&
                         <Tooltip title={`Maximize ${panelName || 'panel'}`} disableFocusListener>
                             <IconButton onClick={doMaximizePanel}><MaximizeIcon /></IconButton>
                         </Tooltip> }
