X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/a92bb3822b537682ca621df3c05a458b9ae3420b..973fce01f05a50d4aa0169a88281f20476b305b2:/src/views/workbench/workbench.test.tsx

diff --git a/src/views/workbench/workbench.test.tsx b/src/views/workbench/workbench.test.tsx
index f7128a74..7b9b74d0 100644
--- a/src/views/workbench/workbench.test.tsx
+++ b/src/views/workbench/workbench.test.tsx
@@ -8,10 +8,19 @@ import Workbench from '../../views/workbench/workbench';
 import { Provider } from "react-redux";
 import configureStore from "../../store/store";
 import createBrowserHistory from "history/createBrowserHistory";
+import { ConnectedRouter } from "react-router-redux";
+
+const history = createBrowserHistory();
 
 it('renders without crashing', () => {
     const div = document.createElement('div');
-    const store = configureStore({ projects: [], router: { location: null } }, createBrowserHistory());
-    ReactDOM.render(<Provider store={store}><Workbench/></Provider>, div);
+    const store = configureStore({ projects: [], router: { location: null }, auth: {} }, createBrowserHistory());
+    ReactDOM.render(
+        <Provider store={store}>
+            <ConnectedRouter history={history}>
+                <Workbench/>
+            </ConnectedRouter>
+        </Provider>,
+    div);
     ReactDOM.unmountComponentAtNode(div);
 });
