X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/a6b824e63de4df4296a17d74d80ff2101820762d..074cc61145869165217e2d35a4b949f92a6829e7:/src/views-components/virtual-machines-dialog/group-array-input.tsx?ds=sidebyside

diff --git a/src/views-components/virtual-machines-dialog/group-array-input.tsx b/src/views-components/virtual-machines-dialog/group-array-input.tsx
index 95a86420..cba9af63 100644
--- a/src/views-components/virtual-machines-dialog/group-array-input.tsx
+++ b/src/views-components/virtual-machines-dialog/group-array-input.tsx
@@ -46,7 +46,6 @@ const styles = (theme: ArvadosTheme) => ({
 });
 
 export const GroupArrayInput = ({name, input, setPartialGroupInput, hasPartialGroupInput}: GroupArrayInputProps & GroupArrayDataProps) => {
-  console.log(hasPartialGroupInput);
   return <GroupArrayField
       name={name}
       commandInput={input}
