X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/a56225865734e581714833201bd1448ba34e0e9d..f4e410a5984226818301332c25ac178403c2e0e9:/src/views/process-log-panel/process-log-form.tsx

diff --git a/src/views/process-log-panel/process-log-form.tsx b/src/views/process-log-panel/process-log-form.tsx
index 698dcb44..eab9fe1d 100644
--- a/src/views/process-log-panel/process-log-form.tsx
+++ b/src/views/process-log-panel/process-log-form.tsx
@@ -31,7 +31,7 @@ export const ProcessLogForm = withStyles(styles)(
         <form autoComplete="off">
             <FormControl className={classes.formControl}>
                 <InputLabel shrink htmlFor="log-label-placeholder">
-                    Log
+                    Event Type
                 </InputLabel>
                 <Select
                     value={selectedFilter.value}
