X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/a37c2265b5f60351bc1f50c22e74650a79110319..4cddd6be7314d0ab3c387b5dcc909780a468410c:/src/views-components/current-token-dialog/current-token-dialog.tsx

diff --git a/src/views-components/current-token-dialog/current-token-dialog.tsx b/src/views-components/current-token-dialog/current-token-dialog.tsx
index ba6c3258..d2acccb7 100644
--- a/src/views-components/current-token-dialog/current-token-dialog.tsx
+++ b/src/views-components/current-token-dialog/current-token-dialog.tsx
@@ -10,7 +10,6 @@ import { WithDialogProps } from '~/store/dialog/with-dialog';
 import { compose } from 'redux';
 import { connect } from 'react-redux';
 import { CurrentTokenDialogData, getCurrentTokenDialogData } from '~/store/current-token-dialog/current-token-dialog-actions';
-import { RootState } from '~/store/store';
 import { DefaultCodeSnippet } from '~/components/default-code-snippet/default-code-snippet';
 
 type CssRules = 'link' | 'paper' | 'button';
