X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/a0e9ecd6a913a6465b500f642412daf1e1a6420b..0da5b926cb7aa461e8d45d86d5fc423d90e768a1:/src/views/main-panel/main-panel.tsx?ds=sidebyside

diff --git a/src/views/main-panel/main-panel.tsx b/src/views/main-panel/main-panel.tsx
index 7592afb3..087163dc 100644
--- a/src/views/main-panel/main-panel.tsx
+++ b/src/views/main-panel/main-panel.tsx
@@ -13,10 +13,11 @@ const mapStateToProps = (state: RootState): MainPanelRootDataProps => {
         user: state.auth.user,
         working: isSystemWorking(state.progressIndicator),
         loading: isWorkbenchLoading(state),
-        buildInfo: state.appInfo.buildInfo
+        buildInfo: state.appInfo.buildInfo,
+        uuidPrefix: state.properties.uuidPrefix
     };
 };
 
 const mapDispatchToProps = null;
 
-export const MainPanel = connect(mapStateToProps, mapDispatchToProps)(MainPanelRoot);
\ No newline at end of file
+export const MainPanel = connect(mapStateToProps, mapDispatchToProps)(MainPanelRoot);
