X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/a0d117b3fae1311a6eb98612946be8966bdf2cf5..c4975431c61ee21b9eaf10b00aa88e5d9858de59:/src/validators/validators.tsx

diff --git a/src/validators/validators.tsx b/src/validators/validators.tsx
index 81fed2cc..6e72ef68 100644
--- a/src/validators/validators.tsx
+++ b/src/validators/validators.tsx
@@ -31,6 +31,8 @@ export const PROCESS_DESCRIPTION_VALIDATION = [maxLength(255)];
 export const REPOSITORY_NAME_VALIDATION = [require, maxLength(255)];
 
 export const USER_EMAIL_VALIDATION = [require, maxLength(255)];
+export const PROFILE_EMAIL_VALIDATION = [maxLength(255)];
+export const PROFILE_URL_VALIDATION = [maxLength(255)];
 export const USER_LENGTH_VALIDATION = [maxLength(255)];
 
 export const SSH_KEY_PUBLIC_VALIDATION = [require, isRsaKey, maxLength(1024)];
