X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/a0d117b3fae1311a6eb98612946be8966bdf2cf5..36c18f380e2a31b532fbdd94208b559bef8d900f:/src/views-components/context-menu/actions/file-viewer-action.test.tsx

diff --git a/src/views-components/context-menu/actions/file-viewer-action.test.tsx b/src/views-components/context-menu/actions/file-viewer-action.test.tsx
index 75f90d83..23bc75ff 100644
--- a/src/views-components/context-menu/actions/file-viewer-action.test.tsx
+++ b/src/views-components/context-menu/actions/file-viewer-action.test.tsx
@@ -2,9 +2,9 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { shallow, configure } from 'enzyme';
-import * as Adapter from 'enzyme-adapter-react-16';
+import Adapter from 'enzyme-adapter-react-16';
 import { FileViewerAction } from './file-viewer-action';
 
 configure({ adapter: new Adapter() });
