X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/a0bace185804d0d263249d65af442bed2890ca7b..c632f0edf3f863fd29efb90e010f286b40cb9e92:/src/components/popover/popover.test.tsx

diff --git a/src/components/popover/popover.test.tsx b/src/components/popover/popover.test.tsx
index fa24c0cd..37007ab4 100644
--- a/src/components/popover/popover.test.tsx
+++ b/src/components/popover/popover.test.tsx
@@ -6,7 +6,7 @@ import * as React from "react";
 import { mount, configure } from "enzyme";
 import * as Adapter from "enzyme-adapter-react-16";
 
-import Popover, { DefaultTrigger } from "./popover";
+import { Popover, DefaultTrigger } from "./popover";
 import Button, { ButtonProps } from "@material-ui/core/Button";
 
 configure({ adapter: new Adapter() });
@@ -38,7 +38,7 @@ describe("<Popover />", () => {
         popover.find(DefaultTrigger).simulate("click");
         expect(popover.find(CustomTrigger)).toHaveLength(1);
     });
-    
+
     it("does not close if closeOnContentClick is not set", () => {
         const popover = mount(
             <Popover>
@@ -66,4 +66,4 @@ const CustomTrigger: React.SFC<ButtonProps> = (props) => (
     <Button {...props}>
         Open popover
     </Button>
-);
\ No newline at end of file
+);
