X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/9f8e9bf57453b23786c9f0deffe0c8a14e28c13c..892d0e98eeb20624cf49ca408af6156b4d3b0f55:/src/views/process-panel/process-panel-root.tsx

diff --git a/src/views/process-panel/process-panel-root.tsx b/src/views/process-panel/process-panel-root.tsx
index 6879d997..deb5f1b0 100644
--- a/src/views/process-panel/process-panel-root.tsx
+++ b/src/views/process-panel/process-panel-root.tsx
@@ -12,7 +12,6 @@ import { SubprocessPanel } from 'views/subprocess-panel/subprocess-panel';
 import { SubprocessFilterDataProps } from 'components/subprocess-filter/subprocess-filter';
 import { MPVContainer, MPVPanelContent, MPVPanelState } from 'components/multi-panel-view/multi-panel-view';
 import { ArvadosTheme } from 'common/custom-theme';
-import { ProcessLogPanel } from 'views/process-log-panel/process-log-panel';
 import { ProcessDetailsCard } from './process-details-card';
 
 type CssRules = 'root';
